0 0.2 0.4 0.6 0.8 1 Millstone Hill (42.62N, 288.51E) 01 Sep 2005 median abs deviation (m/s)

-0.2

-0.1

0

0.1

0.2

Residual (m/s)

243 243.2 243.4 243.6 243.8 244 244.2 244.4 244.6 244.8 245

10 11 12 13 14 15 16 17

20min 4h med Obs

Ne300 TEC Nmax 0.11 0.10 0.08 0.06 0.06 0.06 -- TIEGCM

4 hour median log10 Ne300,Nmax(m-3) TEC(m-2)

Daynumber