0

50

100

150

200 Millstone Hill (42.62N, 288.51E) 01 Sep 2005 median abs deviation (m/s)

-100 -50 0 50 100

Residual (m/s)

243 243.2 243.4 243.6 243.8 244 244.2 244.4 244.6 244.8 245 500

1000

1500

2000

2500 20min 4h med Obs

Tn Ti Te 9.90 29.07 46.41 12.60 12.30 136.35 --av TIEGCM

4 hour median Tn (K)

Daynumber