0

50

100

150

200 Millstone Hill (42.62N, 288.51E) 14-15 Dec 2006 median abs deviation (m/s)

-100 -50 0 50 100

Residual (m/s)

348 348.2 348.4 348.6 348.8 349 349.2 349.4 349.6 349.8 350 500

1000

1500

2000

2500 20min 4h med Obs

Tn Ti Te 7.84 32.61 129.50 13.22 16.76 179.27 --av TIEGCM

4 hour median Tn (K)

Daynumber