100 200 300 400 500 600

Sondrestrom LP 75d+Z (66.99N, 50.95W) 15 May 2005 lgstdNe m-3

9 9.5 10 10.5 11 11.5 12

100 200 300 400 500 600 stdTe(K)

0 200 400 600 800 1000

135 135.25 135.5 135.75 136 100 200 300 400 500 600 stdTi (K)

0 200 400 600 800 1000