0

0.05

0.1

0.15

0.2 Sondrestrom LP 75d+Z (66.99N, 50.95W) 15 May 2005 median abs deviation (m/s)

-0.2

-0.1

0

0.1

0.2

Residual (m/s)

135 135.1 135.2 135.3 135.4 135.5 135.6 135.7 135.8 135.9 136

10 11 12 13 14 15 16 17

298 km 20min 4h med Obs

Ne TEC Nmax 0.07 0.10 0.07 0.03 0.04 0.02 -- TIEGCM

4 hour median log10Ne,Nmax(m-3) TEC(m-2)

Daynumber