0

10

20

30

40 TIEGCM W05 09-13 Nov 2004 median abs deviation (m/s)

-20 -10 0 10 20

Residual (m/s)

314 314.5 315 315.5 316 316.5 317 317.5 318 318.5 319

-150

-100

-50

0

50

100 ....20-min Obs Obs 8.05 concrit 9.45 crb5,10 7.62 crb5,15 6.27 crb7.5,15 5.63

4 hour median Wi (m/s)

Daynumber