HEIGHT (KM)

LATITUDE (DEG) 100 110 120 130 140 150 160 170 180 190 200

0 -20 -40 -60 -80 20 40 60 80

HEIGHT (KM)

LATITUDE (DEG) 100 110 120 130 140 150 160 170 180 190 200

0 -20 -40 -60 -80 20 40 60 80

CONTOUR FROM 0.0000 TO 22.000 CONTOUR INTERVAL OF 2.0000 PT(3,3)= 14.651

0.0

0.0

2.00

2.00

4.00

4.00

6.00

6.00

6.00

8.00

10.0

12.0

12.0

12.0

12.0

12.0

12.0

12.0

12.0

12.0

12.0

12.0

12.0

14.0

14.0

14.0

14.0

14.0

16.0

16.0

16.0

16.0

18.0

18.0

18.0

20.0 20.0

22.0 22.0

HEIGHT (KM)

LATITUDE (DEG) 100 110 120 130 140 150 160 170 180 190 200

0 -20 -40 -60 -80 20 40 60 80

HEIGHT (KM)

LATITUDE (DEG) 100 110 120 130 140 150 160 170 180 190 200

0 -20 -40 -60 -80 20 40 60 80

CONTOUR FROM 6.0000 TO 17.000 CONTOUR INTERVAL OF 1.0000 PT(3,3)= 8.6512

6.00

6.00

6.00

6.00

7.00

7.00

8.00

8.00

8.00

9.00

9.00

9.00

9.00

9.00

9.00

10.0

10.0

10.0

10.0

10.0

10.0

11.0

11.0

11.0

11.0

11.0

11.0

11.0

11.0

11.0

12.0

12.0

12.0

12.0

12.0

12.0

12.0

12.0

12.0

12.0

12.0

12.0

12.0

12.0

13.0

13.0

13.0

13.0

14.0

14.0

14.0

15.0

15.0

16.0

16.0

16.0

17.0

17.0

17.0

HEIGHT (KM)

LATITUDE (DEG) 100 110 120 130 140 150 160 170 180 190 200

0 -20 -40 -60 -80 20 40 60 80

HEIGHT (KM)

LATITUDE (DEG) 100 110 120 130 140 150 160 170 180 190 200

0 -20 -40 -60 -80 20 40 60 80

CONTOUR FROM 8.0000 TO 14.667 CONTOUR INTERVAL OF 0.66667 PT(3,3)= 15.685

8.00

8.00

8.00

8.00

8.00

8.67

8.67

8.67

8.67

8.67

8.67

8.67

8.67

8.67

8.67

9.33

9.33

9.33

9.33

9.33

9.33

9.33

10.0

10.0

10.0

10.0

10.0 10.0

10.7

10.7

10.7

10.7

10.7 10.7

11.3

11.3

11.3

11.3

11.3

11.3

11.3

12.0

12.0

12.0

12.0

12.0

12.0

12.0

12.0

12.7

12.7

12.7

12.7

12.7

13.3

13.3

13.3

13.3

14.0

14.0

14.0 14.0

14.0

14.7

14.7

14.7

14.7

14.7

HEIGHT (KM)

LATITUDE (DEG) 100 110 120 130 140 150 160 170 180 190 200

0 -20 -40 -60 -80 20 40 60 80

HEIGHT (KM)

LATITUDE (DEG) 100 110 120 130 140 150 160 170 180 190 200

0 -20 -40 -60 -80 20 40 60 80

CONTOUR FROM 9.0000 TO 14.500 CONTOUR INTERVAL OF 0.50000 PT(3,3)= 11.345

9.00

9.00

9.00

9.00

9.00

9.00

9.00

9.00

9.00

9.00

9.00

9.50

9.50

9.50

9.50

9.50

9.50

9.50

9.50

9.50

9.50

9.50

10.0

10.0

10.0

10.0

10.0

10.0

10.0

10.0

10.0

10.0

10.0

10.5

10.5

10.5

10.5

10.5

10.5

10.5

10.5 10.5 10.5

10.5

10.5

11.0

11.0

11.0

11.0

11.0

11.0 11.0 11.0

11.0

11.0

11.5

11.5

11.5

11.5

11.5

11.5 11.5 11.5

11.5

12.0

12.0

12.0

12.0

12.0

12.0 12.0

12.0

12.0

12.5

12.5

12.5

12.5

12.5

12.5

12.5

12.5 12.5

13.0

13.0

13.0

13.0

13.5

13.5

13.5

13.5

13.5

14.0

14.0

14.0

14.0

14.0

14.0

14.5

14.5

14.5

14.5 14.5

HEIGHT (KM)

LATITUDE (DEG) 100 110 120 130 140 150 160 170 180 190 200

0 -20 -40 -60 -80 20 40 60 80