LN(P0/P) (INTERFACES)

0

2

4

6

-2

-4

-6

LN(P0/P) (INTERFACES)

0

2

4

6

-2

-4

-6

LN(P0/P) (INTERFACES)

0

2

4

6

-2

-4

-6

LN(P0/P) (INTERFACES)

0

2

4

6

-2

-4

-6

LN(P0/P) (INTERFACES)

0

2

4

6

-2

-4

-6

LN(P0/P) (INTERFACES)

0

2

4

6

-2

-4

-6

LN(P0/P) (INTERFACES)

0

2

4

6

-2

-4

-6

LN(P0/P) (INTERFACES)

0

2

4

6

-2

-4

-6

LN(P0/P) (INTERFACES)

0

2

4

6

-2

-4

-6

LN(P0/P) (INTERFACES)

0

2

4

6

-2

-4

-6

LN(P0/P) (INTERFACES)

0

2

4

6

-2

-4

-6

LN(P0/P) (INTERFACES)

0

2

4

6

-2

-4

-6

LN(P0/P) (INTERFACES)

0

2

4

6

-2

-4

-6

LN(P0/P) (INTERFACES)

0

2

4

6

-2

-4

-6

LN(P0/P) (INTERFACES)

0

2

4

6

-2

-4

-6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5 6

-1 -2 -3 -4 -5 -6

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (MIDPOINTS)

0 1 2 3 4 5

-1 -2 -3 -4 -5

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LN(P0/P) (INTERFACES)

0

2

4

-2

-4

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60

-20 -40 -60

LATITUDE (DEG)

0 20 40 60

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

LATITUDE (DEG)

0 20 40 60 80

-20 -40 -60 -80

TN (DEG K)

180.980

180.985

180.990

180.995

181.000

181.005

181.010

181.015

181.020

181.025

181.030

TN (DEG K)

350 352 354 356 358 360 362 364 366 368

TN (DEG K)

765 770 775 780 785 790 795 800 805 810 815 820 825

TN (DEG K)

805 810 815 820 825 830 835 840 845 850 855 860 865 870

TN (DEG K)

815 820 825 830 835 840 845 850 855 860 865 870 875 880 885

UN (M/S)

0 .02 .04 .06 .08 .10 .12

-.02 -.04 -.06 -.08 -.10 -.12 -.14

UN (M/S)

-19.5 -20.0 -20.5 -21.0 -21.5 -22.0 -22.5 -23.0 -23.5 -24.0 -24.5

UN (M/S)

-32 -34 -36 -38 -40 -42 -44 -46 -48 -50 -52 -54 -56 -58 -60 -62 -64

UN (M/S)

-30 -32 -34 -36 -38 -40 -42 -44 -46 -48 -50 -52 -54 -56 -58 -60 -62

UN (M/S)

-28 -30 -32 -34 -36 -38 -40 -42 -44 -46 -48 -50 -52 -54 -56 -58 -60 -62 -64

VN (M/S)

0 .01 .02 .03 .04 .05

-.01 -.02 -.03 -.04

VN (M/S)

0 .5 1.0 1.5 2.0 2.5 3.0 3.5 4.0 4.5

VN (M/S)

11 12 13 14 15 16 17 18 19 20 21 22 23 24

VN (M/S)

8 10 12 14 16 18 20 22 24

VN (M/S)

6 8 10 12 14 16 18 20 22 24 26 28

LOG10 O1 (CM3)

11.3415

11.3420

11.3425

11.3430

11.3435

11.3440

11.3445

11.3450

11.3455

11.3460

11.3465

11.3470

LOG10 O1 (CM3)

10.898

10.900

10.902

10.904

10.906

10.908

10.910

10.912

10.914

10.916

LOG10 O1 (CM3)

9.432

9.434

9.436

9.438

9.440

9.442

9.444

9.446

9.448

9.450

9.452

9.454

9.456

9.458

9.460

9.462

9.464

9.466

9.468

LOG10 O1 (CM3)

8.700

8.705

8.710

8.715

8.720

8.725

8.730

8.735

8.740

LOG10 O1 (CM3)

7.015

7.020

7.025

7.030

7.035

7.040

7.045

7.050

7.055

7.060

7.065

7.070

7.075

LOG10 O2 (CM3)

12.5961

12.5962

12.5963

12.5964

12.5965

12.5966

12.5967

12.5968

12.5969

LOG10 O2 (CM3)

10.864

10.866

10.868

10.870

10.872

10.874

10.876

10.878

10.880

10.882

10.884

10.886

LOG10 O2 (CM3)

8.158

8.160

8.162

8.164

8.166

8.168

8.170

8.172

8.174

8.176

8.178

8.180

8.182

LOG10 O2 (CM3)

6.770

6.775

6.780

6.785

6.790

6.795

6.800

6.805

6.810

6.815

LOG10 O2 (CM3)

3.48

3.50

3.52

3.54

3.56

3.58

3.60

3.62

3.64

3.66

LOG10 N2 (CM3)

13.1816

13.1817

13.1818

13.1819

13.1820

13.1821

13.1822

13.1823

13.1824

13.1825

LOG10 N2 (CM3)

11.664

11.666

11.668

11.670

11.672

11.674

11.676

11.678

11.680

11.682

11.684

LOG10 N2 (CM3)

9.334

9.336

9.338

9.340

9.342

9.344

9.346

9.348

9.350

9.352

9.354

9.356

9.358

9.360

9.362

9.364

9.366

LOG10 N2 (CM3)

8.116

8.118

8.120

8.122

8.124

8.126

8.128

8.130

8.132

8.134

8.136

8.138

8.140

8.142

8.144

8.146

8.148

LOG10 N2 (CM3)

5.19

5.20

5.21

5.22

5.23

5.24

5.25

5.26

5.27

5.28

5.29

LOG10 NO (CM3)

7.020

7.021

7.022

7.023

7.024

7.025

7.026

7.027

7.028

7.029

7.030

7.031

7.032

7.033

7.034

LOG10 NO (CM3)

7.70

7.71

7.72

7.73

7.74

7.75

7.76

7.77

7.78

7.79

7.80

LOG10 NO (CM3)

5.88

5.89

5.90

5.91

5.92

5.93

5.94

5.95

5.96

5.97

5.98

5.99

6.00

6.01

6.02

6.03

LOG10 NO (CM3)

4.64

4.66

4.68

4.70

4.72

4.74

4.76

4.78

4.80

4.82

4.84

LOG10 NO (CM3)

1.70

1.72

1.74

1.76

1.78

1.80

1.82

1.84

1.86

1.88

1.90

1.92

1.94

1.96

1.98

2.00

2.02

LOG10 N4S (CM3)

5.250

5.255

5.260

5.265

5.270

5.275

5.280

5.285

5.290

5.295

5.300

5.305

5.310

5.315

5.320

5.325

LOG10 N4S (CM3)

5.70

5.72

5.74

5.76

5.78

5.80

5.82

5.84

5.86

5.88

LOG10 N4S (CM3)

6.91

6.92

6.93

6.94

6.95

6.96

6.97

6.98

6.99

LOG10 N4S (CM3)

6.380

6.385

6.390

6.395

6.400

6.405

6.410

6.415

6.420

6.425

6.430

6.435

6.440

6.445

6.450

6.455

LOG10 N4S (CM3)

4.970

4.975

4.980

4.985

4.990

4.995

5.000

5.005

5.010

5.015

5.020

5.025

5.030

5.035

5.040

LOG10 HE (CM3)

8.2090

8.2095

8.2100

8.2105

8.2110

8.2115

8.2120

8.2125

8.2130

8.2135

8.2140

8.2145

8.2150

8.2155

8.2160

8.2165

LOG10 HE (CM3)

7.50

7.52

7.54

7.56

7.58

7.60

7.62

7.64

7.66

7.68

7.70

7.72

LOG10 HE (CM3)

7.08

7.10

7.12

7.14

7.16

7.18

7.20

7.22

7.24

7.26

7.28

7.30

LOG10 HE (CM3)

6.92

6.94

6.96

6.98

7.00

7.02

7.04

7.06

7.08

7.10

7.12

LOG10 HE (CM3)

6.62

6.64

6.66

6.68

6.70

6.72

6.74

6.76

6.78

6.80

6.82

6.84

6.86

6.88

LOG10 NE (CM3)

3.915

3.920

3.925

3.930

3.935

3.940

3.945

3.950

3.955

3.960

3.965

3.970

LOG10 NE (CM3)

4.56

4.58

4.60

4.62

4.64

4.66

4.68

4.70

4.72

4.74

LOG10 NE (CM3)

5.03

5.04

5.05

5.06

5.07

5.08

5.09

5.10

5.11

5.12

5.13

5.14

LOG10 NE (CM3)

5.38

5.40

5.42

5.44

5.46

5.48

5.50

5.52

5.54

5.56

5.58

5.60

LOG10 NE (CM3)

4.78

4.80

4.82

4.84

4.86

4.88

4.90

4.92

4.94

4.96

4.98

5.00

5.02

5.04

5.06

5.08

5.10

TE (DEG K)

174.460

174.465

174.470

174.475

174.480

174.485

174.490

174.495

174.500

174.505

174.510

174.515

174.520

TE (DEG K)

370 372 374 376 378 380 382 384 386 388 390 392

TE (DEG K)

1500

1520

1540

1560

1580

1600

1620

1640

1660

1680

1700

1720

TE (DEG K)

1780

1800

1820

1840

1860

1880

1900

1920

1940

1960

1980

2000

2020

2040

2060

2080

2100

TE (DEG K)

2380

2400

2420

2440

2460

2480

2500

2520

2540

2560

2580

2600

2620

2640

2660

2680

2700

2720

TI (DEG K)

174.47

174.48

174.49

174.50

174.51

174.52

174.53

174.54

174.55

TI (DEG K)

370 372 374 376 378 380 382 384 386 388 390 392 394 396 398 400 402

TI (DEG K)

770 780 790 800 810 820 830 840 850 860

TI (DEG K)

830 840 850 860 870 880 890 900 910 920

TI (DEG K)

1170

1180

1190

1200

1210

1220

1230

1240

1250

1260

1270

1280

1290

TEC ()

66 10^{11}

68 10^{11}

70 10^{11}

72 10^{11}

74 10^{11}

76 10^{11}

78 10^{11}

80 10^{11}

82 10^{11}

84 10^{11}

86 10^{11}

88 10^{11}

90 10^{11}

92 10^{11}

94 10^{11}

96 10^{11}

98 10^{11}

LOG10 O2P (CM3)

3.77

3.78

3.79

3.80

3.81

3.82

3.83

3.84

3.85

LOG10 O2P (CM3)

4.08

4.10

4.12

4.14

4.16

4.18

4.20

4.22

4.24

4.26

LOG10 O2P (CM3)

4.100

4.105

4.110

4.115

4.120

4.125

4.130

4.135

4.140

4.145

4.150

4.155

4.160

LOG10 O2P (CM3)

3.140

3.145

3.150

3.155

3.160

3.165

3.170

3.175

3.180

3.185

3.190

3.195

3.200

3.205

3.210

LOG10 O2P (CM3)

.30 .35 .40 .45 .50 .55 .60 .65 .70

LOG10 OP (CM3)

-1.28 -1.30 -1.32 -1.34 -1.36 -1.38 -1.40 -1.42 -1.44 -1.46 -1.48 -1.50 -1.52

LOG10 OP (CM3)

1.65

1.70

1.75

1.80

1.85

1.90

1.95

2.00

2.05

2.10

2.15

2.20

2.25

LOG10 OP (CM3)

4.86

4.88

4.90

4.92

4.94

4.96

4.98

5.00

5.02

5.04

5.06

LOG10 OP (CM3)

5.38

5.40

5.42

5.44

5.46

5.48

5.50

5.52

5.54

5.56

5.58

5.60

LOG10 OP (CM3)

4.74

4.76

4.78

4.80

4.82

4.84

4.86

4.88

4.90

4.92

4.94

4.96

4.98

5.00

5.02

5.04

5.06

OMEGA (S-1)

0 10 10

20 10

30 10

40 10

50 10

-10 10 -20 10 -30 10 -40 10 -50 10

OMEGA (S-1)

0 10 10^{-9}

20 10^{-9}

30 10^{-9}

40 10^{-9}

50 10^{-9}

60 10^{-9}

-10 10^{-9} -20 10^{-9} -30 10^{-9} -40 10^{-9} -50 10^{-9} -60 10^{-9} -70 10^{-9}

OMEGA (S-1)

0 2 10^{-8}

4 10^{-8}

6 10^{-8}

8 10^{-8}

10 10^{-8}

-2 10^{-8} -4 10^{-8} -6 10^{-8} -8 10^{-8} -10 10^{-8} -12 10^{-8} -14 10^{-8}

OMEGA (S-1)

0 2 10^{-8}

4 10^{-8}

6 10^{-8}

8 10^{-8}

10 10^{-8}

12 10^{-8}

14 10^{-8}

16 10^{-8}

-2 10^{-8} -4 10^{-8} -6 10^{-8} -8 10^{-8} -10 10^{-8} -12 10^{-8} -14 10^{-8} -16 10^{-8} -18 10^{-8}

OMEGA (S-1)

0 5 10^{-8}

10 10^{-8}

15 10^{-8}

20 10^{-8}

-5 10^{-8}

-10 10^{-8}

-15 10^{-8}

-20 10^{-8}

POTEN (VOLTS)

0 1000

2000

3000

4000

5000

6000

-1000 -2000 -3000 -4000 -5000 -6000

POTEN (VOLTS)

0 1000

2000

3000

4000

5000

6000

-1000 -2000 -3000 -4000 -5000 -6000

POTEN (VOLTS)

0 1000

2000

3000

4000

5000

6000

-1000 -2000 -3000 -4000 -5000 -6000

POTEN (VOLTS)

0 1000

2000

3000

4000

5000

6000

-1000 -2000 -3000 -4000 -5000 -6000

POTEN (VOLTS)

0 1000

2000

3000

4000

5000

6000

-1000 -2000 -3000 -4000 -5000 -6000

UI_ExB (cm/s)

-2200 -2400 -2600 -2800 -3000 -3200 -3400 -3600 -3800 -4000 -4200 -4400

UI_ExB (cm/s)

-2200 -2400 -2600 -2800 -3000 -3200 -3400 -3600 -3800 -4000 -4200 -4400 -4600

UI_ExB (cm/s)

-2000 -2200 -2400 -2600 -2800 -3000 -3200 -3400 -3600 -3800 -4000 -4200 -4400

UI_ExB (cm/s)

-1800 -2000 -2200 -2400 -2600 -2800 -3000 -3200 -3400 -3600 -3800 -4000 -4200

UI_ExB (cm/s)

-1800 -2000 -2200 -2400 -2600 -2800 -3000 -3200 -3400 -3600 -3800 -4000 -4200

VI_ExB (cm/s)

0 200 400 600 800 1000

-200

-400

-600

VI_ExB (cm/s)

0 100 200 300 400 500 600 700 800

-100 -200 -300 -400 -500

VI_ExB (cm/s)

0 100 200 300 400 500 600 700 800

-100 -200 -300 -400 -500

VI_ExB (cm/s)

0 100 200 300 400 500 600 700 800

-100 -200 -300 -400 -500

VI_ExB (cm/s)

0 100 200 300 400 500 600 700 800

-100 -200 -300 -400 -500

WI_ExB (cm/s)

0 50 100 150

-50 -100 -150 -200 -250 -300 -350

WI_ExB (cm/s)

0 50 100 150

-50 -100 -150 -200 -250 -300 -350

WI_ExB (cm/s)

0 50 100 150

-50 -100 -150 -200 -250 -300 -350

WI_ExB (cm/s)

0 50 100 150

-50 -100 -150 -200 -250 -300 -350

WI_ExB (cm/s)

0 50 100 150

-50 -100 -150 -200 -250 -300 -350

DEN (g/cm3)

104644 10^{-14}

104646 10^{-14}

104648 10^{-14}

104650 10^{-14}

104652 10^{-14}

104654 10^{-14}

104656 10^{-14}

104658 10^{-14}

104660 10^{-14}

104662 10^{-14}

104664 10^{-14}

104666 10^{-14}

104668 10^{-14}

104670 10^{-14}

104672 10^{-14}

104674 10^{-14}

104676 10^{-14}

DEN (g/cm3)

3130 10^{-14}

3140 10^{-14}

3150 10^{-14}

3160 10^{-14}

3170 10^{-14}

3180 10^{-14}

3190 10^{-14}

3200 10^{-14}

3210 10^{-14}

3220 10^{-14}

3230 10^{-14}

3240 10^{-14}

3250 10^{-14}

3260 10^{-14}

3270 10^{-14}

DEN (g/cm3)

206 10^{-15}

208 10^{-15}

210 10^{-15}

212 10^{-15}

214 10^{-15}

216 10^{-15}

218 10^{-15}

220 10^{-15}

222 10^{-15}

DEN (g/cm3)

226 10

228 10

230 10

232 10

234 10

236 10

238 10

240 10

242 10

DEN (g/cm3)

270 10^{-18}

275 10^{-18}

280 10^{-18}

285 10^{-18}

290 10^{-18}

295 10^{-18}

300 10^{-18}

305 10^{-18}

310 10^{-18}

315 10^{-18}

320 10^{-18}

325 10^{-18}

QJOULE (erg/g/s)

.2 .4 .6 .8 1.0 1.2 1.4 1.6 1.8 2.0 2.2 2.4 2.6 2.8 3.0 3.2 3.4 3.6 3.8 4.0

QJOULE (erg/g/s)

0 1000

2000

3000

4000

5000

6000

7000

8000

9000

QJOULE (erg/g/s)

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

24000

26000

QJOULE (erg/g/s)

10000

15000

20000

25000

30000

35000

40000

45000

50000

55000

QJOULE (erg/g/s)

8000

10000

12000

14000

16000

18000

20000

22000

24000

26000

28000

30000

32000

Z (KM)

96.3690

96.3695

96.3700

96.3705

96.3710

96.3715

96.3720

96.3725

96.3730

96.3735

96.3740

96.3745

96.3750

Z (KM)

116.56

116.58

116.60

116.62

116.64

116.66

116.68

116.70

116.72

116.74

116.76

116.78

116.80

116.82

116.84

116.86

116.88

116.90

Z (KM)

210.0

210.5

211.0

211.5

212.0

212.5

213.0

213.5

214.0

214.5

215.0

215.5

216.0

216.5

Z (KM)

286 287 288 289 290 291 292 293 294 295 296 297

Z (KM)

478 480 482 484 486 488 490 492 494 496 498 500 502 504 506 508 510 512

ZG (KM)

96.3690

96.3695

96.3700

96.3705

96.3710

96.3715

96.3720

96.3725

96.3730

96.3735

96.3740

96.3745

96.3750

ZG (KM)

114.90

114.92

114.94

114.96

114.98

115.00

115.02

115.04

115.06

115.08

115.10

115.12

115.14

115.16

115.18

115.20

115.22

ZG (KM)

202.0

202.5

203.0

203.5

204.0

204.5

205.0

205.5

206.0

206.5

207.0

207.5

208.0

208.5

ZG (KM)

275 276 277 278 279 280 281 282 283 284 285

ZG (KM)

466 468 470 472 474 476 478 480 482 484 486 488 490 492 494 496 498 500 502