LN(P0/P) (INTERFACES)

NEUTRAL TEMPERATURE

0

2

4

6

8

-2

-4

-6

-8 150 250 350 450 550 650 750

LN(P0/P) (INTERFACES)

ELECTRON DENSITY

0

2

4

6

8

-2

-4

-6

-8 3.8 4.0 4.2 4.4 4.6 4.8 5.0 5.2 5.4